\documentclass[fleqn,12pt,leqno]{jarticle}
\usepackage{amsmath,amssymb}

\setlength{\oddsidemargin}{0truecm}
\setlength{\evensidemargin}{0truecm}
\setlength{\topmargin}{0truecm}
\setlength{\headsep}{0truecm}
\setlength{\textwidth}{16.5truecm}
\setlength{\textheight}{22truecm}

\input{../lib/macro.tex}

\begin{document}
\noindent{\Large ��� I �׻��齬 (2005/07/07)}
\medskip
\input{diag.tex}
\end{document}
